<template>
  <div :class="containerClasses">
      <v-container class="fill-height" fluid>
        <v-row align="center" justify="center">
          <v-col cols="12" sm="8" md="6" lg="4">
            <v-card class="elevation-12 rounded-lg">
              <v-card-text class="text-center pa-8">
                <div class="mb-6">
                  <v-icon 
                    color="success" 
                    size="80"
                    class="mb-4"
                  >
                    mdi-check-circle
                  </v-icon>
                  
                  <h1 class="text-h4 font-weight-bold text-success mb-3">
                    Email Verified Successfully!
                  </h1>
                  
                  <p class="text-body-1 text-medium-emphasis mb-2" v-if="email">
                    Your email address <strong>{{ email }}</strong> has been verified.
                  </p>
                  
                  <p class="text-body-1 text-medium-emphasis mb-6">
                    Your MonacoUSA Portal account is now active and ready to use.
                    You can now log in to access your dashboard and member features.
                  </p>

                  <!-- Warning message for partial verification -->
                  <v-alert
                    v-if="partialWarning"
                    type="warning"
                    variant="tonal"
                    class="mb-4 text-start"
                    icon="mdi-information"
                  >
                    <div class="text-body-2">
                      <strong>Note:</strong> Your email has been verified, but there may have been 
                      a minor issue updating your account status. If you experience any login 
                      problems, please contact support.
                    </div>
                  </v-alert>
                </div>

                <div class="d-flex flex-column gap-3">
                  <v-btn
                    color="primary"
                    size="large"
                    variant="elevated"
                    block
                    @click="goToPasswordSetup"
                    class="text-none"
                  >
                    <v-icon start>mdi-lock-plus</v-icon>
                    Set Your Password
                  </v-btn>

                  <v-btn
                    color="outline"
                    size="small"
                    variant="text"
                    block
                    to="/"
                    class="text-none"
                  >
                    <v-icon start>mdi-home</v-icon>
                    Return to Home
                  </v-btn>
                </div>

                <!-- Additional help -->
                <div class="mt-6 pt-4 border-t">
                  <p class="text-caption text-medium-emphasis mb-2">
                    Need help? Contact support at:
                  </p>
                  <v-chip
                    size="small"
                    variant="outlined"
                    prepend-icon="mdi-email"
                  >
                    support@monacousa.org
                  </v-chip>
                </div>
              </v-card-text>
            </v-card>
          </v-col>
        </v-row>
      </v-container>
  </div>
</template>

<script setup lang="ts">

definePageMeta({
  layout: false,
  middleware: 'guest'
});

// Get query parameters
const route = useRoute();
const email = computed(() => route.query.email as string || '');
const partialWarning = computed(() => route.query.warning === 'partial');

// Static CSS classes based on device (no reactive dependencies)
const containerClasses = ref('verification-success');

// Setup password URL for Keycloak - Fixed URL structure
const setupPasswordUrl = computed(() => {
  const runtimeConfig = useRuntimeConfig();
  const keycloakIssuer = runtimeConfig.public.keycloakIssuer || 'https://auth.monacousa.org/realms/monacousa';
  
  // Use the correct Keycloak account management URL
  // Remove the hash fragment that was causing 404 errors
  return `${keycloakIssuer}/account/`;
});

// Set page title with mobile viewport optimization
useHead({
  title: 'Email Verified - MonacoUSA Portal',
  meta: [
    {
      name: 'description',
      content: 'Your email has been successfully verified. You can now log in to the MonacoUSA Portal.'
    },
    { name: 'viewport', content: 'width=device-width, initial-scale=1.0, maximum-scale=1.0, user-scalable=no' }
  ]
});

// Go to password setup page
const goToPasswordSetup = () => {
  navigateTo({
    path: '/auth/setup-password',
    query: {
      email: email.value
    }
  });
};

// Track verification
onMounted(() => {
  // Static device detection from Nuxt Device Module - no reactive dependencies
  const { isMobile, isIos, isSafari } = useDevice();
  
  // Detect mobile Safari specifically
  const isMobileSafari = isMobile && isIos && isSafari;
  
  // Apply classes once (static, no reactivity)
  const containerClassList = ['verification-success'];
  if (isMobile) containerClassList.push('is-mobile');
  if (isMobileSafari) containerClassList.push('is-mobile-safari');
  if (isIos) containerClassList.push('is-ios');
  containerClasses.value = containerClassList.join(' ');

  console.log('[verify-success] Email verification completed', { 
    email: email.value,
    partialWarning: partialWarning.value,
    setupPasswordUrl: setupPasswordUrl.value 
  });
});
</script>

<style scoped>
.verification-success {
  min-height: 100vh;
  min-height: calc(var(--vh, 1vh) * 100); /* Mobile Safari fallback */
  background: linear-gradient(135deg, #f5f7fa 0%, #c3cfe2 100%);
  overflow-x: hidden; /* Prevent horizontal scroll on mobile */
}

/* Mobile Safari optimizations */
.verification-success.is-mobile-safari {
  min-height: 100vh;
  min-height: -webkit-fill-available;
}

.verification-success.performance-mode {
  will-change: auto;
  transform: translateZ(0); /* Lighter hardware acceleration */
}

.fill-height {
  min-height: 100vh;
  min-height: calc(var(--vh, 1vh) * 100); /* Mobile Safari fallback */
}

/* Mobile Safari fill-height optimization */
.is-mobile-safari .fill-height {
  min-height: -webkit-fill-available;
}

.border-t {
  border-top: 1px solid rgba(var(--v-border-color), var(--v-border-opacity));
}

.gap-3 {
  gap: 12px;
}

/* Animation for the success icon - reduced for performance mode */
.v-icon {
  animation: bounce 0.6s ease-in-out;
}

.performance-mode .v-icon {
  animation: none; /* Disable animations on performance mode */
}

@keyframes bounce {
  0%, 20%, 53%, 80%, 100% {
    transform: translate3d(0, 0, 0);
  }
  40%, 43% {
    transform: translate3d(0, -8px, 0);
  }
  70% {
    transform: translate3d(0, -4px, 0);
  }
  90% {
    transform: translate3d(0, -2px, 0);
  }
}

/* Custom scrollbar for mobile */
::-webkit-scrollbar {
  width: 4px;
}

::-webkit-scrollbar-track {
  background: rgba(255, 255, 255, 0.1);
}

::-webkit-scrollbar-thumb {
  background: rgba(163, 21, 21, 0.5);
  border-radius: 2px;
}

/* Responsive adjustments */
@media (max-width: 600px) {
  .verification-success {
    padding: 16px;
  }
  
  .v-card {
    margin: 0;
  }
  
  /* Optimize button spacing on mobile */
  .gap-3 {
    gap: 8px;
  }
}

/* Improve touch targets on mobile */
@media (hover: none) and (pointer: coarse) {
  .v-btn {
    min-height: 48px; /* Ensure touch-friendly button size */
  }
}

/* Performance mode optimizations */
.performance-mode .v-card {
  box-shadow: 0 2px 8px rgba(0, 0, 0, 0.1) !important; /* Lighter shadow */
}

.performance-mode .v-btn {
  transition: none; /* Remove button transitions for better performance */
}
</style>
